EDOC225

M

i d a s

TCL Support Library (common.tcl)

Edition 1.0

Dec 1995

Nuclear Physics Support Group

Central Laboratory of the Research Councils

Daresbury Laboratory

TCL Support Library

This document describes a Support Library (SL) of TCL procedures which

provide general purpose facilities for a TCL application.

list manipulation procedures

procedures which return items from TCL lists

procedure first list-name returns 1st element from the list

procedure second list-name returns 2nd element from the list

procedure third list-name returns 3rd element from the list

procedure fourth list-name returns 4th element from the list

procedure fifth list-name returns 5th element from the list

procedure sixth list-name returns 6th element from the list

procedure seventh list-name returns 7th element from the list

procedure eighth list-name returns 8th element from the list

procedure nineth list-name returns 9th element from the list

procedure tenth list-name returns 10th element from the list

procedure last list-name returns last element from the list

procedure head list-name returns the 1st element from the list (i.e.

identical to procedure first ).

procedure tail list-name returns a list in which the 1st element has

been removed from the list.

procedure front list-name returns a list in which the last element has

been removed from the list.

procedure self option

option is one of

frame-name returns the global variable frame in the form of a

TK window path name. This will thus be the path name of the master frame

window.

frame-title returns the global variable frametitle or a null string

if it has not been defined.

icon-title returns the global variable icontitle or a null string

if it has not been defined.

graphical support procedures

procedure set-footer [widget-name] text-string

widget-name is an optional argument which should be the name of a frame

widget. By default the master frame name is used.

text-string is written into the footer window of the frame widget.

procedure clear-footer [widget-name]

widget-name is an optional argument which should be the name of a frame

widget. By default the master frame name is used.

The footer window of the frame widget is cleared (a null string is written into

it).

The following procedures control frame widgets . They all have an optional

argument which should be the name of a frame widget . By default the master

frame is used.

procedure open-frame [widget-name]

The frame window is de-iconized (if it is currently iconized) and raised in the

stacking order so that it is visible. The procedures bring-to-front and show-

frame are aliases for open-frame .

procedure close-frame [widget-name]

The frame window is iconized. The procedure

pr ocedure destroy-frame [widget-name]

The frame window is withdrawn from the screen (if it is currently displayed or

iconized) and deleted.

The following procedures are used to report error conditions

procedure display-midas-error-report proc-name error-number text

proc-name is the name of a procedure which should be called with the

argument frame-name to return the window which is to be used as the parent

for the generated dialog window. Normally the procedure self is used.

error-number is the error code to be reported.

text is any further textual information to be added to the dialog window.

procedure display-error-report proc-name text

proc-name is the name of a procedure which should be called with the

argument frame-name to return the window which is to be used as the parent

for the generated dialog window. Normally the procedure self is used.

text is any further textual information to be added to the dialog window.

procedure remove-error-report proc-name

proc-name is the name of a procedure which should be called with the

argument frame-name to return the window which is the parent of the dialog

window. Normally the procedure self is used.

The dialog window is destroyed.