EUROGAM DETECTOR ANGLES.

Row  Number Compound
of Detectors  Angle
8  5  22.4
7  10  46.43
Centre  5  63.44
6  10  72.05
5  5  85.84
4  5  94.16
3  10  107.94
Centre  5  116.56
2  10  133.57
1  5  157.60

Angles between beam direction centre of Ge detector.