Naming scheme for EUROGAM detectors

EUROGAM detectors are to be labelled by type (G germaniun detector, S sup-

pression shield), ownership (U UK, F F rance), manufacturer (O OR

TEC, I Interte ch-

nique, P PGT, E Englehard and C Crismatec) and for germanium detectors C for

single crystal and S for stacke d planar detectors.

eg. The �rst 5 BGO shields are

SUE1, SUE2, SUE3, SUC4 and SUC5.

and the �rst 3 germanium detectors are. GUOC1, GUOC2 and GUIC3.

J.Simpson.