Naming scheme for EUROGAM detectors

EUROGAM detectors are to be labelled by type (G germaniun detector, S suppression shield), ownership (U UK, F France), manufacturer (O ORTEC, I Intertechnique, P PGT, E Englehard and C Crismatec) and for germanium detectors C for single crystal and S for stacked planar detectors. eg. The first 5 BGO shields are SUE1, SUE2, SUE3, SUC4 and SUC5. and the first 3 germanium detectors are. GUOC1, GUOC2 and GUIC3.

J.Simpson.