(a) ^9Be(^{24}Mg,^{16}O ^{16}O)n

↓ Q_{ggg}

120 140 160 180 200 220 Total Energy / MeV 0

500

1000

1500

Counts per Channel

(b) ^9Be(^{24}Mg,^{16}O ^{16}O)n

↓ Q_{ggg}

120 140 160 180 200 220 Total Energy / MeV 0

500

1000

1500

Counts per Channel