1.0 1.5 2.0 2.5 3.0 Shaping time (μs) 2.0

3.0

4.0

5.0

6.0

7.0

Width (percent of height)

T1: 100μm anode + 100μm shield, T2: 100μm anode + 20μm shield

T1 190V T1 380V T1 570V T2 190V T2 380V T2 570V