1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 Strip number

0.98

1.00

1.02

1.04

1.06

1.08

1.10

ΔE signal/ΔE signal of strip 8

April 1994 carbon data, 20 μm anode grid, no shield grid

Telescope 1 Telescope 2