CH/DOC/94/12

Equipment at the ANU

Inventory after July ’94 Running

Author: R.P. Ward

Date: 21 Sep 1994

ANU Equipment Inventory, July 1994

Mounted Targets

Material Thickness [¯g cm�^2] Number Remarks 12C 100 1 12C 200 2 12C 450 2 12C 300 4 12C 180 3 SiO_2 50 3 Flash gold 5 on 10 2 Very fragile 197Au 125 2

Unmounted Target Material

Material Thickness [¯g cm�^2] Area [cm^2] Remarks 12C 10 60 SiO_2 50 72 Flash gold 5 on 10 24 197Au 125 6

Exabytes

32 � 112m unused. We also have a large number of spare copies, which I suggest

we start recycling (or ship home for recycling, if people want to write data to new tapes).

Anode Grids

7 � 100 ¯m (1 horizontal, 6 vertical). 2 � 20 ¯m (1 horizontal, 1 vertical).

5 � 20 ¯m (all horizontal).

Shield Grids

2 � frames. 3 � 20 ¯m. 2 � 100 ¯m.

Windows

8 � 3.5 ¯m (1 used).

Detectors

9 Hammamatsu detectors (numbers 4, 5, 6, 9, 10, 12, 13, 14 and 15. Number 15 has 3 strips missing; the others have no strips missing). 3 new and 10 used Micron detectors.

Shipping

We have been shipping equipment to the ANU for temporary use via Local Port Practice at Manchester. However, when the return shipment came to Customs at Birmingham ,it was delayed for three weeks. I thus sugggest that we ensure that outward and return shipping is always done via Manchester in future.