CH/DOC/92/11

Index

Information about the ANU

Author: W.D.M. Rae

Date: 21 Sep 1991

Information About Running at the Australian National University

Information gathered during the September 1992 visit is collected together into a blue A4 book and a folder of loose documents, plus two booklets of photographs.

These are now held at Birmingham, and are indexed below.

Staff Position Name Secretary Mrs Anne Gillard Boss George Dracoulis academic Boss Trevor Ophel academic Boss David Weisser academic Targets Bob Turkentine Data Acquisition Gordon Foote Chamber Jack Leigh academic Seminars David Hinde academic Gas Detectors Keith Fifield academic Machine David Weisser academic Head of Department George Dracoulis academic Electronics John Kennedy Res. School

Contents of Blue Book Item Description Pages 1 Chamber 1—10 2 Workshop 11 3 Minimum Lower Angle 12 4 Cable run 13 5 Control room layout 14 6 Oscilliscope 15 7 Chamber controls 16—18 8 Running in chamber 19 9 Data acquisition 20—24 10 Electricity 25 11 Effort 26 12 Targets 27 13 Internet 28 14 Beam height 29 15 Cabling chamber 30 16 Running dates 31 17 Coffee — tea — DLW 32 18 Isobutane 33 19 Vacuum 34 20 Machine/ beams 35 21 Exchange scheme 36 22 Other documents 37 23 Staff 38 24 University Housing (see also 44) 39 25 Car rental 40 26 Electronics/ cables pool 41 27 Control room facilities 42 28 Drawings 43 29 Housing (see also 39) 44 30 Posted reports 45 31 Sydney Bus 46 32 YHA 48 33 Cars 49 34 E-mail 50 35 Cables, feedthroughs, arm mounts 51—52 36 Notes on final discussions 53

Other Documents Item Description 1 Annual Report 1991 2 Campus map 3 Accomodation guides, booklets 4 VAX/VMS account, information, telnet numbers 5 Drawings of vacuum chambers 6 Operating vacuum chamber controls 7 Operation of scattering chamber 8 Plan of LINAC 9 Section through scattering chamber 10 Top view of scattering chamber 11 Australian Academy of Science — exchange with UK 12 Bilateral Science and Technology DITCC 13 Cleaning and plating methods for vacuum 14 Vacuum Notes I — III (by post) 15 Mail from Paddy Regan 16 Sample schedule 17 Bill does not believe in number 17 18 Photographs (2m scattering chamber) 19 University Housing Applications 20 Mail from Paddy (2) 21 Bill does not believe in number 21 22 Liversidge Court 23 University House 24 Invitation Letter Draft 25 THK (inner bearings) — addresses 26 Agreement document 27 Isolation of chamber — picture 28 Information on Sydney 29 Map of Canberra 30 Map of Sydney 31 YHA information 32 Original map of campus 33 ANU telephone directory 34 Ursula College 35 Canberra Travellers’ Guide 36 Canberra guide 37 Royal Society Fellowships/ Australia 38 Australian Visa Applications

Drawings Item Description

2m Scattering Chamber

1 Scattering Chamber Section (1” = 1 cm?) 2 Bolt Holes and Support Fix 3 Target Assembly Mechanism 4 General assembly: Arm Drive 5 Lid matching details 6 Monitor Counter Holder 7 Monitor Counter Plate 8 4–detector angle plate 9 Drive and lead through 10 Details of port locations and sizes 11 Collimator mounting bracket 12 Drive leadthrough 13 Top flange and sight 14 Main drive details

15 Beam layout and Control Room plan

2m Scattering Chamber

16 Monitor Counter Mounts 17 Feedthrough ports on base of chamber

Photgraph Booklet 1 — Scattering Chamber — No. Description

1 2m Scattering Chamber 2 2m Scattering Chamber — other angle 3 Feedthroughs on base 4 Lid – vacuum interchange 5 View from switcher 6 Local electronics and control 7 Back of chamber 8 Cryopump and control 9 Feedthrough patch 10 Cable path — chamber 11 Cable path — support 12 Cables into duct 13 View of lid 14 Second view of lid 15 Another view of base 16 Lid raising and support 17 Gas feedthroughs 18 Detector Arm 19 Detector arm closeup 20 beam collimator arm 21 Another arm view 22 Arm movement electronics 23 Another arm view 24 Bare arm 25 Centre of chamber 26 Centre closeup

Photgraph Booklet 2 — Charissa — No. Description

1 Beam collimator arm 2 Beam collimator and tube 3 Target holder 4 Centre (bare) 5 Working in chamber ! 6 Chamber beam line 7 Multi-purpose beam line 8 Closer view — Multi-purpose beam line 9 Other side — Multi-purpose beam line 10 Enge chamber 11 Test chamber 12 Control Room — 1 13 Control Room — 2 14 Electronics opposite 15 Electronics to left 16 Two data acquisition stations 17 Space for Charissa 18 Cables out duct 19 ADC’s 20 Data acquisition — 1 21 CAMAC crate — 1 22 CAMAC crate — 2 23 ADC interface 24 ADC’s again

Collated on behalf of Charissa collaboration by William Rae September 1992

and painstakingly typed by WNC