CH/Doc/92/03

Charissa

List of references

Author: Wilton Catford

Date: August 13, 1992

Cumulative List of References

Source copies of these documents are kept on file at Surrey. If you require copies, please contact W.N. Catford (wnc@dl.nnga).

Table 1: Minutes of Charissa Group Meetings

Ref. No. Venue Meeting Date Minutes Date

CH/Meet/92/01 Birmingham 4 March 92 5 March 92 CH/Meet/92/02 Daresbury 29 April 92 8 May 92 CH/Meet/92/03 Oxford 11 June 92 13 Aug 92

Table 2: Agendas for Charissa Group Meetings

Ref. No. Venue Meeting Date

CH/Agen/92/01 Birmingham 4 March 92 CH/Agen/92/02 Daresbury 29 April 92 CH/Agen/92/03 Oxford 11 June 92 CH/Agen/92/04 Birmingham 24 August 92

Table 3: Technical Reports

Ref. No. Author Title Date

CH/Tech/92/01 B.R. Fulton Silicon Detector News 27 April 92 CH/Tech/92/02 N.M. Clarke Progress on Scintillation Detectors 27 Feb 92 CH/Tech/92/03 N.M. Clarke Letter re Fitting Code 16 March 92 CH/Tech/92/04 R.A. Hunt Proposals for Charissa Electronics 28 April 92 CH/Tech/92/05 N.M. Clarke Progress on Scintillation Detectors 8 May 92 CH/Tech/92/06 B.R. Fulton Computing, Data Acquisition and Control 19 May 92 CH/Tech/92/07 B.R. Fulton Silicon Detector Developments 10 June 92 CH/Tech/92/08 N.M. Clarke Test on Prototype CsI Scintillator 11 June 92 CH/Tech/92/09 W.D.M. Rae/D.Smith New Bias Supply for Charissa 19 May 92 CH/Tech/92/10 R.A. Hunt Charissa Amplifier Development 10 June 92

Table 4: Documents and Non-technical Reports

Ref. No. Author Title Date

CH/DOC/92/01 W.N. Catford List of Names of Collaborators 13 Aug 92 CH/DOC/92/02 N.M. Clarke Update on the ICARE project at Strasbourg

28 March 92

CH/DOC/92/03 W.N. Catford This cumulative list August 13, 1992 CH/DOC/92/04 W.D.M. Rae Matchstick Calibrations 2 June 92 CH/DOC/92/05 B.F. Fulton Proposal for a Joint French–UK collaboration

10 April 92