CH/Agen/99/04

Agenda

Charissa Group Meeting

To be held on: Wednesday, 3 Nov 1999, 11.00 am To be held at: Birmingham Distribution: char-meeting@nnga.daresbury.ac.uk

0. Apologies and welcome to new members

1. Debrief on ANU running - list of problems on chamber and
    DA system - what needs to be done to fix these - who will
    do what - when will they be completed?

2. Strasbourg DA system is in pieces in the Long Lab at Birmingham.
    Much of it is faulty (computers and hardware). What needs
    fixing - who will do this - when is it needed for?

3. We have a load of hardware for the new GANIL setup (preamps,
    amps, ADC’s crates etc.). How are we going to put it all
    together and test it - where will this be done - by whome -
    when is it needed by?

4. There have been tentative plans for a further period of running
    at ANU in January. However, we have just been informed the
    LINAC is not available then. Need to re-think this.

5. Working without Steve Singer

6. Any other business

7. Date of next meeting

W.N. Catford (Secretary) 2 Nov 1999