12.0 14.0 16.0 18.0 20.0 Centre of mass energy [MeV] 0.0

200.0

400.0

600.0

800.0

Total cross-section [mb]

6Li + ^{58}Ni 7Li + ^{58}Ni 6Li + ^{118}Sn 7Li + ^{118}Sn