0.0

0.2

0.4

0.6

0.8

V( r =12.4 fm) (MeV)

20 30 40 50 60 70 80 90 100 110 120 130 140 150 160 E_{LAB} (MeV) 0.0

0.2

0.4

0.6

0.8

W( r = 12.4 fm) (MeV)

0.0

0.2

0.4

0.6

0.8

V (r =12.4 fm) (MeV)

20 30 40 50 60 70 80 90 100 110 120 130 140 150 160 E_{LAB} (MeV) 0.0

0.2

0.4

0.6

0.8

W( r = 12.4 fm) (MeV)