50.0 90.0 130.0 170.0 210.0 0.0 100.0

200.0

300.0

400.0

500.0

600.0 L’=14

L’=16 L’=18

0.0 200.0

400.0

600.0

800.0

1000.0

1200.0

1400.0

L’=12 L’=14 L’=16

0.0 100.0

200.0

300.0

400.0

500.0

600.0

L’=10 L’=12 L’=14

50.0 90.0 130.0 170.0 210.0

37.5 MeV

43.0 MeV

Counts

(b)

32.5 MeV

(c)

ϕ∗_P (deg)

(d) L’=12

L’=14

L’=16

(a)

37.5 MeV (e)

(f)

32.5 MeV

43.0 MeV θ_P=103.0^o θ_P=103.0^o

θ_P=101.5^o θ_P=101.5^o

θ_P=100.5^o θ_P=100.5^o