0.0 200.0 400.0 600.0

J(J+1) 0.0

10.0

20.0

30.0

40.0

50.0

60.0

E_{c.m.}(MeV)

0 1 2 3 4 5 6

246 8 10 12 14 16 18 20 22 24 J

Cormier data Present data K=0

K=6

K