30.0 35.0 40.0 45.0

E_{c.m.} (MeV) 0.0

200.0

400.0

600.0

800.0

Normalized Yield (10^4 C^{-1})

3_1^-+3_1^-

0.0

0.1

0.2

0.3

0.4

0.5

Detection Efficiency (%)

Efficiency