60.0 100.0 140.0 180.0 220.0 0.0

100.0

200.0

300.0

0.0

100.0

200.0

300.0

400.0

60.0 100.0 140.0 180.0 220.0

Χ=χ_B+χ_B’ Χ=χ_B-χ_B’

L’=12

L’=14

Counts

L’=16

L’=18 3_1^-+3_1^-

ϕ∗_B +Χk/(L’+0.5) (deg)

E_{c.m.}=37.5 MeV