30.0 35.0 40.0 45.0

E_{c.m.} (MeV)

0.00

0.10

0.20

0.30

0.40

0.50

0.60

0.70

0.80

0.90

1.00

1.10

1.20

1.30

1.40

1.50

Relative detection efficiency (%)

0_2^++0_2^+ 0_2^++3_1^- 3_1^-+3_1^-

0_2^++0_1^+ 0_2^++2_1^+ 3_1^-+0_1^+ 3_1^-+2_1^+