30.0 35.0 40.0 45.0

E_{c.m.} (MeV) 0.0

200.0

400.0

600.0

800.0

Normalized Yield (10^4 C^{-1})

0_2^++0_2^+ 0_2^++3_1^- 3_1^-+3_1^-

0.0

0.4

0.8

1.2

1.6

d^2σ/dΩ_1dΩ_2 (μb sr^{-2})