0.0

20.0

40.0

60.0

80.0

100.0

-30.0 -20.0 -10.0 0.0 Q (MeV) 0.0 250.0

500.0

750.0

1000.0

1250.0

0_2^++0_2^+

3_1^-+3_1^-

0_1^++0_2^+

(b)

0_2^++3_1^- (a)

0_1^++3_1^-

2_1^++0_2^+ 2_1^++3_1^-

Yield (arb. units)

3α+3α hits

3α+1 hits