90.0 115.0 140.0 165.0 190.0 215.0 0.0 50.0

100.0

150.0

200.0 0.0 50.0

100.0

150.0

200.0

90.0 115.0 140.0 165.0 190.0 215.0

L’=9

L’=11

Counts

L’=13

L’=15 0_2^++3_1^+

ϕ∗_B +χ_Bk/(L’+0.5) (deg)