80.0 105.0 130.0 155.0 180.0 205.0 0.0

500.0

1000.0

1500.0 0.0

500.0

1000.0

1500.0

80.0 105.0 130.0 155.0 180.0 205.0

L’=9

L’=11

Counts

L’=13

L’=15 0_1^++3_1^-

ϕ∗_B +χ_Bk/(L’+0.5) (deg)