70.0 80.0 90.0 100.0 110.0 0.0

10.0

20.0

30.0

32.50

0.0

10.0

20.0

30.0

30.00

70.0 80.0 90.0 100.0 110.0

31.25

32.50

33.75

Normalized Counts

θ

30.00 MeV

31.25 MeV

32.50 MeV

33.75 MeV

c.m.(deg)

0_2^++0_2^+