Ex=22.1 MeV (J=6) (75 MeV)

0 50 100 150 200 0

20

40

60

80

100

120 Ex=22.1 MeV (J=8) (85 MeV)

0 50 100 150 0 5 10 15 20 25 30 35 40

Ex=23.1 MeV (J=6)

0 50 100 150 200 0 5 10 15 20 25 30 35 40 45 Ex=23.4 MeV (J=8)

0 50 100 150 0 10 20 30 40 50 60 70

ψ (degrees)

Counts