Ex=27.0 MeV (J=10)

20 40 60 80 100 120 140 0 20 40 60 80 100 120 Ex=28.0 MeV (J=10)

20 40 60 80 100 120 140 0 20 40 60 80 100 120

Ex=28.4 MeV (J=10)

20 40 60 80 100 120 140 0 10 20 30 40 50 60 70 80 90 100 Ex=29.2 MeV (J=12)

20 40 60 80 100 120 140 0

20

40

60

80

100

120

Ex=30.0 MeV (J=10)

20 40 60 80 100 120 140 0 10 20 30 40 50 60 70 80 Ex=31.9 MeV (J=12)

20 40 60 80 100 120 140 0

50

100

150

200

250

Ex=35.6 MeV (J=14)

20 40 60 80 100 120 140 0 20 40 60 80 100 120 140

ψ (degrees)

Counts