20 22 24 26 28 30 32 34 36 38 40 42 0 100 200 300 400 500 600 700 800 900 1000

20 22 24 26 28 30 32 34 36 38 40 42 0 20 40 60 80 100 120 140 160 180 200

Ex(^{24}Mg) (MeV)

Counts

(a)

(b)