0 50 100 150 200 250 300 350 400

0

100

200

300

400

500

16 18 20 22 24 26 28 30 32 34 36 38 40 0 50 100 150 200 250 300 350 400 450

------- 8.2 %

------- 9.4 %

------- 7.5 %

Ex(^{24}Mg) (MeV)

Counts

(a)

(b)

(c)