0 20 40 60 80 100 120 140

0 50 100 150 200 250 300 350 400

12C(^{16}O,^{16}O ^8Be)^4He

12C(^{16}O,^{12}C ^{12}C)^4He

Ex(^{24}Mg) MeV

Counts Γ_{cc}/Γ_{OBe}

Γ_{cc}/Γ_{Tot}

0.0 0.5 1.0 1.5 2.0 2.5 3.0

18 20 22 24 26 28 30 32 34 36 38 40 42

0.00

0.05

0.10

8

8

10

10 12

12

8 10

10 10 12

10 12 12

14 14

11 9 10 12 12 13 11