(a) ^{12}C(^{16}O,^{12}C ^{12}C)^4He E_{beam}=115 MeV

-50 -40 -30 -20 -10 0 Q-value (MeV) 0

5000

10000

15000

20000

Counts

(b) ^{12}C(^{16}O,^{16}O ^8Be)^4He E_{beam}=75 MeV

-50 -40 -30 -20 -10 0 Q-value (MeV) 0

5000

10000

Counts