0.0 1.0 2.0 3.0 Shaping time (μs) 0.5

1.0

1.5

2.0

Resolution (mm)

(a) 85MeV ^{12}C 385μm PSD (centre) 85MeV ^{12}C 385μm PSD (edge) 5.5MeV α 385μm PSD (centre) 5.5MeV α 500μm PSD (centre)