%Intro to The MEGHA manual                                 Steve Chappell

\chapter*{Preface}

This document is intended as a guide to the MEGHA facility and
associated equipment for running charged particle experiments at the
Australian National University Canberra. The following pages describe
procedures for operating an evolving system.  Some sections will
inevitably have reached their ``use by date'' by the time you read
this.  Please refer to documentation local to the ANU and the latest
version of this manual on the Charissa server at Daresbury for updates
to the procedures described herein. {\bfseries\itshape If the
procedures change during your experiment or you find an error UPDATE
this manual by WRITING in it!} Space has been provided at the end for
additional comments. Most importantly, be careful out there and use the
force!\\
\\
{\itshape Steve Chappell}.
