%The MEGHA manual                                 Steve Chappell

\documentclass[10pt]{spgcrep}
\usepackage{psfig}

\setlength{\topmargin}{-1.4cm}
\setlength{\oddsidemargin}{1.0cm}
\setlength{\evensidemargin}{\oddsidemargin}
\setlength{\textwidth}{15.0cm}
\setlength{\headheight}{1.0cm}
\setlength{\headsep}{0.5cm}
\setlength{\footskip}{0.75cm}
\setlength{\textheight}{23.0cm}

\begin{document}

\input{./title.tex}
\pagestyle{headings}
\pagenumbering{arabic}
\setcounter{page}{2}
\input{./pref.tex}
\tableofcontents
\listoffigures
\listoftables
\input{./chamb.tex}
\input{./array.tex}
\input{./sarray.tex}
\input{./gas.tex}
\input{./anu.tex}
\appendix
\input{./inv.tex}
\input{./plc.tex}
\input{./chamb2.tex}
\input{./notes.tex}


\end{document}
