1000 1500 2000 2500 3000 X/arb units 0 500 1000

1500

2000

Counts

Hamamatsu PSD Xslice 85 MeV ^{197}Au(^{12}C,^{12}C)

0.5mm 0.3mm

0.2mm

0.1mm