2000 2200 2400 2600 2800 3000 Channel 0

5

10

15

20

Counts

2800 3000 3200 3400 3600 0 2 4 6 8 10

Counts

500 600 700 800 900 1000 0 5 10 15 20 25

Counts

1500 1600 1700 1800 1900 2000 Channel 0 20 40 60 80 100 120

Counts

2100 2200 2300 2400 2500 2600 0

10

20

30

40

Counts

2200 2300 2400 2500 2600 2700 0 5 10 15 20 25

Counts

Hama PSD Intrinsic Energy Resolutions

85 MeV ^{12}C 170 MeV ^{24}Mg

1 μS

3 μS

6 μS

1 μS

3 μS

6 μS

270 KeV FWHM

210 KeVFWHM

320 KeV FWHM

480 KeV FWHM

360 KeV FWHM

540 KeV FWHM