1800 2000 2200 Channel No. 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Counts

Elastics "Peak" 170 MeV ^{197}Au(^{24}Mg,^{24}Mg) E 1 μS Integration time

(2) (3)

(4)

(5) (6) 0 500 1000 1500 2000 2500 0

500

1000

1500

2000