0 1000 2000 3000 4000 Channel 0 2000

4000

6000

8000

10000

Counts

0 1000 2000 3000 4000 0

2000

4000

6000

8000

Counts

0 1000 2000 3000 4000 0

2000

4000

6000

8000

Counts

0 1000 2000 3000 4000 Channel 0 5000

10000

15000

20000

25000

30000

35000

Counts

0 1000 2000 3000 4000 0 5000

10000

15000

20000

Counts

0 1000 2000 3000 4000 0 2000

4000

6000

8000

10000

12000

14000

Counts

Energy Response 85 MeV ^{12}C (+ Mesh) Hama Inter

1 μS

3 μS

6 μS

1 μS

3 μS

6 μS