0 50 100 150 200 Channel No. 0

1000

2000

3000

Counts

0 50 100 150 200 0 500 1000

1500

2000

Counts

0 50 100 150 200 0 1000

2000

3000

4000

Counts

1μS

2μS

3μS 5.5 MeV α’s

630 KeV FWHM