120 140 160 Etot/MeV 0

20

40

60

Counts

120 140 160 0

100

200

300

Counts

12C(^{24}Mg,^{12}C^{12}C)^{12}C

(a) Recoil data E > 0 MeV

(b) Breakup data E > 0 MeV

Q_{ggg}