8.0 9.0 10.0 11.0 12.0 1

10

100

1000 Limits ... (0_3^+) (1^-)

32.50 MeV

Normalized Counts

E_x (MeV)

%Efficiency x100 Raw Data

Corrected Data

0_2^+

(1^-)

3_1^-

(0_3^+)