15.0 17.0 19.0 21.0 0.0 20.0

40.0

60.0

80.0

100.0

120.0

140.0

32.50

Normalized Counts

E_x(s) + E_x(d) (MeV)

3_1^-+3_1^-

0_2^++3_1^-

0_2^++0_2^+

32.50 MeV